X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/book_gpu.git/blobdiff_plain/afa299e693f71360f1ce504754768b26916e5475..f5f65ba95372a03403c3c51dcdb62faf9b2d6462:/BookGPU/Chapters/chapter15/ch15.tex?ds=inline

diff --git a/BookGPU/Chapters/chapter15/ch15.tex b/BookGPU/Chapters/chapter15/ch15.tex
index 0225579..33ef011 100644
--- a/BookGPU/Chapters/chapter15/ch15.tex
+++ b/BookGPU/Chapters/chapter15/ch15.tex
@@ -8,7 +8,7 @@ The Queen's University of Belfast, United Kingdom}
 
 %\newcommand{\fixme}[1]{{\bf #1}}
 
-\chapter[Numerical validation on GPUs in atomic physics]{Numerical validation and performance optimization on GPUs of an application in atomic physics} 
+\chapter[Numerical validation and GPU performance in atomic physics]{Numerical validation and performance optimization on GPUs of an application in atomic physics} 
 \label{chapter15}
 
 \section{Introduction}\label{ch15:intro}
