X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/book_gpu.git/blobdiff_plain/c08513a856650905e4751c8b52c7cbb661368a5f..9378973df8e8a9aac4a7c212a7efb7d831bfae94:/BookGPU/sunil.cls

diff --git a/BookGPU/sunil.cls b/BookGPU/sunil.cls
index 6c26076..1455f91 100755
--- a/BookGPU/sunil.cls
+++ b/BookGPU/sunil.cls
@@ -572,7 +572,7 @@
   \else
     \clearpage
   \fi
-  \thispagestyle{plain}%
+  \thispagestyle{empty}%
   \if@twocolumn
     \onecolumn
     \@tempswatrue
