X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/book_gpu.git/blobdiff_plain/f3c358c4bba6851fbf01121853d7e21866f01884..0d39f3bfb1736ae41805f75a779e0bb01f4f5139:/BookGPU/sunil.cls

diff --git a/BookGPU/sunil.cls b/BookGPU/sunil.cls
index 6c26076..1455f91 100755
--- a/BookGPU/sunil.cls
+++ b/BookGPU/sunil.cls
@@ -572,7 +572,7 @@
   \else
     \clearpage
   \fi
-  \thispagestyle{plain}%
+  \thispagestyle{empty}%
   \if@twocolumn
     \onecolumn
     \@tempswatrue
