X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/canny.git/blobdiff_plain/1f13377c795bf75c3186bc2d132326cfdd6f7559..bd2fce977129b24b117509715dada6f0c0a0f98a:/canny.tex?ds=inline

diff --git a/canny.tex b/canny.tex
index c6ab2f1..e69de29 100644
--- a/canny.tex
+++ b/canny.tex
@@ -1,6 +0,0 @@
-\documentclass{article}
-
-\begin{document}
-
-
-\end{document}
