X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/canny.git/blobdiff_plain/3cb99fa4936f62fef8a0f24880e7d9bca9c31a9e..1bfb9cc8f38edd065a52de421a0dc41567c4262c:/main.tex?ds=sidebyside

diff --git a/main.tex b/main.tex
index 0d0e95b..38bcd1a 100755
--- a/main.tex
+++ b/main.tex
@@ -39,7 +39,7 @@ edge-based steganographic approach}
 
 \begin{abstract}
 A novel steganographic method called STABYLO is introduced in this research work.
-Its main reason for being is to be much lighter than the so-called
+Its main avantage for being is to be much lighter than the so-called
 Highly Undetectable steGO (HUGO) method, a well known state of the art
 steganographic process. Additionally to this effectiveness, 
 quite comparable results through noise measures like PSNR-HVS-M, 
@@ -86,9 +86,9 @@ For future work, the authors' intention is to investigate systematically
 all the existing edge detection methods, to see if the STABYLO evaluation scores can
 be improved by replacing Canny with another edge filter. We will try
 to take into account the least significant bits too during all the
-stages of the algorithm, hoping by doing so to be more close to the HUGO scores against 
+stages of the algorithm, hoping by doing so to be closer to the HUGO scores against 
 steganalyzers. Other steganalyzers than the ones used in this document will be
-regarded for the sake of completeness. Finally, the
+examined for the sake of completeness. Finally, the
 systematic replacement of all the LSBs of edges by binary digits provided
 by the BBS generator will be investigated, and the consequences of such a 
 replacement, in terms of security, will be discussed.
