X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/canny.git/blobdiff_plain/4516d82b16c946a9e8a9cadd0011616e8a66cc31..01e8c9301dc7bf227e7fbe18962c62bcb9cc848f:/experiments.tex

diff --git a/experiments.tex b/experiments.tex
index 40cd93b..0b4d6d7 100644
--- a/experiments.tex
+++ b/experiments.tex
@@ -1,3 +1,6 @@
+\subsection{Adaptive Embedding Rate} 
+
+
 
 \subsection{Image Quality}
 The visual quality of the STABYLO scheme is evaluated in this section.
@@ -17,7 +20,7 @@ The other last ones have been designed to tackle this problem.
 Embedding rate &  Adaptive 
 10 \% &  \\
 \hline
-PSNR &      &      \\
+PSNR &  66.55    & 61.86     \\
 \hline
 PSNR-HVS-M & 78.6  & 72.9 \\
 \hline
