X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/canny.git/blobdiff_plain/4516d82b16c946a9e8a9cadd0011616e8a66cc31..274073a1e4ae1b4de1220e26626a582a08a890d6:/experiments.tex?ds=inline

diff --git a/experiments.tex b/experiments.tex
index 40cd93b..0011cd4 100644
--- a/experiments.tex
+++ b/experiments.tex
@@ -1,3 +1,6 @@
+\subsection{Adaptive Embedding Rate} 
+
+
 
 \subsection{Image Quality}
 The visual quality of the STABYLO scheme is evaluated in this section.
@@ -17,7 +20,7 @@ The other last ones have been designed to tackle this problem.
 Embedding rate &  Adaptive 
 10 \% &  \\
 \hline
-PSNR &      &      \\
+PSNR &  66.55    & 61.86     \\
 \hline
 PSNR-HVS-M & 78.6  & 72.9 \\
 \hline
@@ -36,6 +39,7 @@ Compare to the Edge Adpative scheme detailed in~\cite{Luo:2010:EAI:1824719.18247
 \JFC{comparer aux autres approaches}
 
 
+
 \subsection{Steganalysis}
 
 
@@ -74,4 +78,3 @@ Ensemble Classifier &   &      &      \\
 \end{table}
 
 
-\JFC{Raphael, il faut donner des rÃ©sultats ici}
\ No newline at end of file
