X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/canny.git/blobdiff_plain/e1408e22528148d27bf1cc1edc56764345c64cba..b1b65804c7c985c998293a21318b5f68e51159e3:/experiments.tex

diff --git a/experiments.tex b/experiments.tex
index cd2ed1a..e4db410 100644
--- a/experiments.tex
+++ b/experiments.tex
@@ -58,7 +58,7 @@ wPSNR & 86.43& 77.47 \\
 
 Let us compare the STABYLO approach with other edge based steganography
 schemes with respect to the image quality.
-Fist off all, wPSNR and PSNR of the Edge Adaptive
+First of all, wPSNR and PSNR of the Edge Adaptive
 scheme detailed in~\cite{Luo:2010:EAI:1824719.1824720} are lower than ours.
 Next both the approaches~\cite{DBLP:journals/eswa/ChenCL10,Chang20101286}
 focus on increasing the payload while the PSNR is acceptable, but do not 
