X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/chloroplast13.git/blobdiff_plain/c4b8574ec6286851c72e12b9a0d2838c3ccdb0e9..d72cbe1c61987671906c2cce939728c280e868cb:/main.tex?ds=sidebyside

diff --git a/main.tex b/main.tex
index 6a6c3d5..611fff1 100755
--- a/main.tex
+++ b/main.tex
@@ -1,4 +1,4 @@
-\documentclass[12pt]{article}
+\documentclass{article}
 \usepackage{subfig}
 \usepackage{color}
 \usepackage{graphicx}
@@ -7,7 +7,6 @@
 \usepackage{algorithm}
 \usepackage{algorithmic}
 \usepackage{longtable}
-\usepackage{pdflscape}
 
 
 % correct bad hyphenation here
@@ -28,7 +27,7 @@ FEMTO-ST Institute, UMR 6174 CNRS\\
 Computer Science Laboratory DISC,
 University of Franche-Comt\'{e},
 Besan\c con, France.\\
- $*:$ Authors in alphabetic order.\\
+$*:$ Authors in alphabetic order.\\
 }
 \newcommand{\JFC}[1]{\begin{color}{green}\textit{}\end{color}}
 \newcommand{\CG}[1]{\begin{color}
