X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/desynchronisation-controle.git/blobdiff_plain/1216fb04e58a581d9a4d2e77355aaf47bf989447..refs/heads/master:/IWCMC14/main.tex?ds=sidebyside

diff --git a/IWCMC14/main.tex b/IWCMC14/main.tex
index b887bc2..4be8723 100644
--- a/IWCMC14/main.tex
+++ b/IWCMC14/main.tex
@@ -21,10 +21,11 @@
 \newcommand{\CG}[1]{\begin{color}{blue}\textit{}\end{color}}
 
 
+\newcommand{\R}[0]{\ensuremath{\mathbb{R}}}
 
 
 \author{
-  Jean-Fran\c{c}cois Couchot, \and 
+  Jean-Fran\c{c}cois COuchot, \and 
   Ahmed Mostefaoui\\
   FEMTO-ST Institute, UMR 6174 CNRS\\
   DISC Department, University of Franche-Comt\'{e}\\
@@ -88,17 +89,16 @@
 
 \subsection{A closer look to convexity}
 \input{convexity}
-\JFC{On doit parler du probleme pour Ps}
 
-\subsection{Directly retreiving the argmin}
+\subsection{Directly retrieving the argmin}
 \input{argmin}
 
 
 
 
-\subsection{Fault-Tolerence Considerations}
+\subsection{Fault-Tolerance Considerations}
+
 
-\
 
 
 \section{Discussion and Future Work}
@@ -107,7 +107,7 @@
 
 %\bibliographystyle{compj}
 \bibliographystyle{IEEEtran}
-\bibliography{forensicsVer4}
+\bibliography{biblioand,abbrev}
 
 
 
