<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/desynchronisation-controle.git/blobdiff_plain/65cd965ec2d71c53e2516304650c28e6431506f8..3c56b3b02a655b0e8048c31ca707edfc14e923c7:/IWCMC14/main.tex?ds=inline

diff --git a/IWCMC14/main.tex b/IWCMC14/main.tex
index 7ca975e..52404b8 100644
--- a/IWCMC14/main.tex
+++ b/IWCMC14/main.tex
@@ -24,7 +24,7 @@
 
 
 \author{
-  Jean-Fran\c cois Couchot, \and 
+  Jean-Fran\c{c}cois Couchot, \and 
   Ahmed Mostefaoui\\
   FEMTO-ST Institute, UMR 6174 CNRS\\
   DISC Department, University of Franche-Comt\'{e}\\
</pre></body></html>