X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/desynchronisation-controle.git/blobdiff_plain/921131116b4d4b4dea91fb53e126383821fe30de..120c13fc4faf264d8b1d3e94c4799860de9e3dea:/IWCMC14/main.tex?ds=sidebyside

diff --git a/IWCMC14/main.tex b/IWCMC14/main.tex
index f77d4eb..67018d3 100644
--- a/IWCMC14/main.tex
+++ b/IWCMC14/main.tex
@@ -75,19 +75,30 @@
 
 
 
-\section{Improving an Existing Scheme}
+\section{Basics of Existing Scheme}
 \input{HLG}
 
 
-\subsection{A closer look to convexity}
+\section{Improving }
 
-\subsection{Directly retreiving the argmin}
 
 \subsection{Convergence Detection} 
+\input{convergence}
+
+
+\subsection{A closer look to convexity}
+\input{convexity}
+\JFC{On doit parler du probleme pour Ps}
+
+\subsection{Directly retrieving the argmin}
+\input{argmin}
+
+
+
+
+\subsection{Fault-Tolerance Considerations}
 
-\section{Fault-Tolerence Considerations}
 
-\
 
 
 \section{Discussion and Future Work}
