X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/desynchronisation-controle.git/blobdiff_plain/e02082ad2d87032e8cff4fa8cc48682c85efc624..refs/heads/master:/IWCMC14/main.tex?ds=sidebyside

diff --git a/IWCMC14/main.tex b/IWCMC14/main.tex
index bd4e952..4be8723 100644
--- a/IWCMC14/main.tex
+++ b/IWCMC14/main.tex
@@ -25,7 +25,7 @@
 
 
 \author{
-  Jean-Fran\c{c}cois Couchot, \and 
+  Jean-Fran\c{c}cois COuchot, \and 
   Ahmed Mostefaoui\\
   FEMTO-ST Institute, UMR 6174 CNRS\\
   DISC Department, University of Franche-Comt\'{e}\\
@@ -107,7 +107,7 @@
 
 %\bibliographystyle{compj}
 \bibliographystyle{IEEEtran}
-\bibliography{abbrev,biblioand}
+\bibliography{biblioand,abbrev}
 
 
 
