X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/desynchronisation-controle.git/blobdiff_plain/eff67eeac67ec967add0eb7e5e90d500ac32a491..c4e399c461dd18f8ebd98333cc45aaf32a6769a4:/IWCMC14/main.tex?ds=inline

diff --git a/IWCMC14/main.tex b/IWCMC14/main.tex
index 49d816d..67018d3 100644
--- a/IWCMC14/main.tex
+++ b/IWCMC14/main.tex
@@ -1,4 +1,4 @@
-\documentclass[10pt]{IEEEtran}
+\documentclass{IEEEtran}
 \usepackage[utf8]{inputenc}
 \usepackage[T1]{fontenc}
 \usepackage[english]{babel}
@@ -90,15 +90,15 @@
 \input{convexity}
 \JFC{On doit parler du probleme pour Ps}
 
-\subsection{Directly retreiving the argmin}
+\subsection{Directly retrieving the argmin}
 \input{argmin}
 
 
 
 
-\subsection{Fault-Tolerence Considerations}
+\subsection{Fault-Tolerance Considerations}
+
 
-\
 
 
 \section{Discussion and Future Work}
