X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hdrcouchot.git/blobdiff_plain/c1f6ce3a24b92bfb8dd4da3d9092666c73adbcc9..fcbc9202a51285ff17060f4d330eca0d57b2a3c1:/talk/xplprngyestheorieko.tex?ds=inline

diff --git a/talk/xplprngyestheorieko.tex b/talk/xplprngyestheorieko.tex
index 64ca989..446a036 100644
--- a/talk/xplprngyestheorieko.tex
+++ b/talk/xplprngyestheorieko.tex
@@ -5,7 +5,7 @@
 \begin{minipage}{0.8\textwidth}
 \begin{itemize}
 \item Seules 16 vÃ©rifient les hypothÃ¨ses du thÃ©orÃ¨me prÃ©cÃ©dent.
-\item $b$: nombre d'itÃ©rations suffisant pour une dÃ©viation p.r. la distribution uniforme inf. Ã   $10^{-4}$. 
+\item $b$: nombre d'itÃ©rations suffisant pour une dÃ©viation p.r. la distribution uniforme inf. Ã   $10^{-4}$ (temps de mÃ©lange). 
 
 \begin{center}
   \begin{tiny}
@@ -39,6 +39,6 @@ aux tests  du \emph{National Institute of Standards and Technology} (NIST).
 \item GÃ©nÃ©rateur prouvÃ© chaotique seulement pour $b=1$.
 \item Pas compatible avec la pratique: $b \geq 42$ nÃ©cessaire
   pour suivre une loi uniforme (Ã  $10^{-4}$ prÃ¨s).
-\item $\leadsto$ Etendre la thÃ©orie.
+\item $\leadsto$ Ãtendre la thÃ©orie.
 \end{itemize}
 \end{itemize}
