X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/0addef29acd938694a719f449408934f533ce96c..e553247c89ca119de64f276a58fc83a1951a7d1b:/hpcc.tex?ds=sidebyside

diff --git a/hpcc.tex b/hpcc.tex
index 7cb74fa..7d934e2 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -554,7 +554,6 @@ computers organized with interconnected clusters have been presented.
 Our work has demonstrated that using such a simulation tool allow us to 
 reach the following three objectives: 
 
-\newcounter{numberedCntD}
 \begin{enumerate}
 \item To have a flexible configurable execution platform resolving the 
 hard exercise to access to very limited but so solicited physical 
@@ -564,7 +563,6 @@ iteration number ;
 \item and finally and more importantly, to find the correct combination 
 of the cluster and network specifications permitting to save time in 
 executing the algorithm in asynchronous mode.
-\setcounter{numberedCntD}{\theenumi}
 \end{enumerate}
 Our results have shown that in certain conditions, asynchronous mode is 
 speeder up to \np[\%]{40} than executing the algorithm in synchronous mode
@@ -580,7 +578,7 @@ mode in a grid architecture.
 \section*{Acknowledgment}
 
 This work is partially funded by the Labex ACTION program (contract ANR-11-LABX-01-01).
-The authors would like to thank\dots{}
+\todo[inline]{The authors would like to thank\dots{}}
 
 
 % trigger a \newpage just before the given reference
