X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/0d6c7fbfb35dbfc041886ff260a29ce8da9017d0..9af4bc7ffb98f4e627eb1df644d86428b676104f:/hpcc.tex?ds=sidebyside

diff --git a/hpcc.tex b/hpcc.tex
index b9e6bf3..83753da 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -294,7 +294,10 @@ referenced therein for the validity of the network models.  Comparisons between
 real execution of MPI applications on the one hand, and their simulation with
 SMPI on the other hand, are presented in~\cite{guermouche+renard.2010.first,
   clauss+stillwell+genaud+al.2011.single,
-  bedaride+degomme+genaud+al.2013.toward}.
+  bedaride+degomme+genaud+al.2013.toward}.  All these works conclude that
+SimGrid is able to simulate pretty accurately the real behavior of the
+applications.
+
 
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 \section{Simulation of the multisplitting method}
