X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/0e6d063a9e15647ffb71be54897a88cbe7c9a5b4..549adc5739f5afe33d12e1afd1b309896839f71d:/hpcc.tex

diff --git a/hpcc.tex b/hpcc.tex
index c79ed41..fd2b6ff 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -715,7 +715,7 @@ demonstrated an original solution to optimize the use of a simulation
 tool to run efficiently an iterative parallel algorithm in asynchronous 
 mode in a grid architecture. 
 
-For our futur works, we plan to extend our experimentations to larger scale platforms by increasing the number of computing cores and the number of clusters. 
+In future works, we plan to extend our experimentations to larger scale platforms by increasing the number of computing cores and the number of clusters. 
 We will also have to increase the size of the input problem which will require the use of a more powerful simulation platform. At last, we expect to compare our simulation results to real execution results on real architectures in order to experimentally validate our study.
 
 \section*{Acknowledgment}
