X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/15be2239bf8d8970cea0817752bbee94c1fbeccd..7fa502af50f815451a303c3ba53ae8f7a152525c:/hpcc.tex?ds=sidebyside

diff --git a/hpcc.tex b/hpcc.tex
index e0db0c2..6140ad3 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -634,11 +634,9 @@ Note that the program was run with the following parameters:
 \item PLATFORM: XML file description of the platform architecture whith the following characteristics: %two clusters (cluster1 and cluster2) with the following characteristics :
   \begin{itemize}
   \item 2 clusters of 50 hosts each;
-  \item Processor unit power: \np[GFlops]{1.5};
-  \item Intracluster network bandwidth: \np[Gbit/s]{1.25} and latency:
-    \np[$\mu$s]{0.05};
-  \item Intercluster network bandwidth: \np[Mbit/s]{5} and latency:
-    \np[$\mu$s]{5};
+  \item Processor unit power: \np[GFlops]{1} or \np[GFlops]{1.5};
+  \item Intra-cluster network bandwidth: \np[Gbit/s]{1.25} and latency: \np[$\mu$s]{0.05};
+  \item Inter-cluster network bandwidth: \np[Mbit/s]{5} or \np[Mbit/s]{50} and latency: \np[$\mu$s]{20};
   \end{itemize}
 \end{itemize}
 
