X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/a8b4b3a23b1c1582ea09a8d170c1024eec85a965..664f844ffe608be37e65a2061489a0c09ebb731d:/hpcc.tex?ds=sidebyside

diff --git a/hpcc.tex b/hpcc.tex
index 16a5943..ae3a229 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -624,12 +624,13 @@ Note that the program was run with the following parameters:
 \begin{itemize}
 \item HOSTFILE: Text file containing the list of the processors units name. Here 100 hosts;
 \item PLATFORM: XML file description of the platform architecture : two clusters (cluster1 and cluster2) with the following characteristics :
-
-	- Processor unit power : 1.5 GFlops;
-
-	- Intracluster network : bandwidth = 1,25 Gbits/s and latency = \np{E-5} ms;
-
-	- Intercluster network : bandwidth = 5 Mbits/s and latency = 5.\np{E-3} ms;
+  \begin{itemize}
+  \item Processor unit power: \np[GFlops]{1.5};
+  \item Intracluster network bandwidth: \np[Gbit/s]{1.25} and latency:
+    \np[$\mu$s]{0.05};
+  \item Intercluster network bandwidth: \np[Mbit/s]{5} and latency:
+    \np[$\mu$s]{5};
+  \end{itemize}
 \end{itemize}
 
 
