X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/b0ee8b83448638cdcf35adfbbc1e6186b8ae7acf..8c35d2df5432dd07c403167c131d03b03c1c9d6e:/hpcc.tex

diff --git a/hpcc.tex b/hpcc.tex
index 530ddb7..dc816e2 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -484,7 +484,7 @@ The ratio between the simulated execution time of synchronous GMRES algorithm
 compared to the asynchronous multisplitting algorithm ($t_\text{GMRES} / t_\text{Multisplitting}$) is defined as the \emph{relative gain}. So,
 our objective running the algorithm in SimGrid is to obtain a relative gain greater than 1.
 A priori, obtaining a relative gain greater than 1 would be difficult in a local
-area network configuration where the synchronous mode will take advantage on the
+area network configuration where the synchronous GMRES method will take advantage on the
 rapid exchange of information on such high-speed links. Thus, the methodology
 adopted was to launch the application on a clustered network. In this
 configuration, degrading the inter-cluster network performance will penalize the
