X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/b13fc7fa257018cdf2c847b8aace0b386e38d166..0addef29acd938694a719f449408934f533ce96c:/hpcc.tex?ds=sidebyside

diff --git a/hpcc.tex b/hpcc.tex
index 3d861f3..7cb74fa 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -332,7 +332,7 @@ shared memory used by threads simulating each computing units in the Simgrid arc
 also to be reviewed. Finally, some compilation errors on MPI\_waitall and MPI\_Finalise primitives have been fixed with the latest version of Simgrid.
 In total, the initial MPI program running on the simulation environment SMPI gave after a very simple adaptation the same results as those obtained in a real 
 environment. We have tested in synchronous mode with a simulated platform starting from a modest 2 or 3 clusters grid to a larger configuration like simulating 
-Grid5000 with more than 1500 hosts with 5000 cores [?]. Once the code debugging and adaptation were complete, the next section shows our methodology and experimental 
+Grid5000 with more than 1500 hosts with 5000 cores~\cite{bolze2006grid}. Once the code debugging and adaptation were complete, the next section shows our methodology and experimental 
 results.
 
 
