X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/b13fc7fa257018cdf2c847b8aace0b386e38d166..f85fa60f36ab8e5b94e91ce13cdb1b283274d991:/hpcc.tex?ds=inline

diff --git a/hpcc.tex b/hpcc.tex
index 3d861f3..dc68db9 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -332,7 +332,7 @@ shared memory used by threads simulating each computing units in the Simgrid arc
 also to be reviewed. Finally, some compilation errors on MPI\_waitall and MPI\_Finalise primitives have been fixed with the latest version of Simgrid.
 In total, the initial MPI program running on the simulation environment SMPI gave after a very simple adaptation the same results as those obtained in a real 
 environment. We have tested in synchronous mode with a simulated platform starting from a modest 2 or 3 clusters grid to a larger configuration like simulating 
-Grid5000 with more than 1500 hosts with 5000 cores [?]. Once the code debugging and adaptation were complete, the next section shows our methodology and experimental 
+Grid5000 with more than 1500 hosts with 5000 cores~\cite{bolze2006grid}. Once the code debugging and adaptation were complete, the next section shows our methodology and experimental 
 results.
 
 
@@ -554,7 +554,6 @@ computers organized with interconnected clusters have been presented.
 Our work has demonstrated that using such a simulation tool allow us to 
 reach the following three objectives: 
 
-\newcounter{numberedCntD}
 \begin{enumerate}
 \item To have a flexible configurable execution platform resolving the 
 hard exercise to access to very limited but so solicited physical 
@@ -564,7 +563,6 @@ iteration number ;
 \item and finally and more importantly, to find the correct combination 
 of the cluster and network specifications permitting to save time in 
 executing the algorithm in asynchronous mode.
-\setcounter{numberedCntD}{\theenumi}
 \end{enumerate}
 Our results have shown that in certain conditions, asynchronous mode is 
 speeder up to \np[\%]{40} than executing the algorithm in synchronous mode
