X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/c535d2d4b5927973fabfb0ea4d99de5df953ed20..d44333276c7703cc17f0052a7df0a4b25ba1ded4:/hpcc.tex?ds=sidebyside

diff --git a/hpcc.tex b/hpcc.tex
index 2c7217b..67609d7 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -512,51 +512,51 @@ $\text{62}^\text{3} = \text{\np{238328}}$ to $\text{150}^\text{3} =
   \caption{2 clusters, each with 50 nodes}
   \label{tab.cluster.2x50}
 
-  \begin{mytable}{6}
+  \begin{mytable}{5}
     \hline
-    bandwidth (Mbits/s)
-    & 5         & 5         & 5         & 5         & 5         & 50 \\
+    bandwidth (Mbit/s)
+    & 5         & 5         & 5         & 5         & 5         \\
     \hline
     latency (ms)
-    & 0.02      & 0.02      & 0.02      & 0.02      & 0.02      & 0.02 \\
+    & 0.02      & 0.02      & 0.02      & 0.02      & 0.02      \\
     \hline
     power (GFlops)
-    & 1         & 1         & 1         & 1.5       & 1.5       & 1.5 \\
+    & 1         & 1         & 1         & 1.5       & 1.5       \\
     \hline
     size
-    & 62        & 62        & 62        & 100       & 100       & 110 \\
+    & 62        & 62        & 62        & 100       & 100       \\
     \hline
     Precision
-    & \np{E-5}   & \np{E-8}  & \np{E-9}  & \np{E-11} & \np{E-11} & \np{E-11} \\
+    & \np{E-5}  & \np{E-8}  & \np{E-9}  & \np{E-11} & \np{E-11} \\
     \hline
     \hline
     Relative gain
-    & 2.52     & 2.55     & 2.52     & 2.57     & 2.54     & 2.53 \\
+    & 2.52      & 2.55      & 2.52      & 2.57      & 2.54      \\
     \hline
   \end{mytable}
 
   \bigskip
 
-  \begin{mytable}{6}
+  \begin{mytable}{5}
     \hline
-    bandwidth (Mbits/s)
-    & 50        & 50        & 50        & 50 \\ %       & 10        & 10 \\
+    bandwidth (Mbit/s)
+    & 50        & 50        & 50        & 50        & 50 \\ %       & 10        & 10 \\
     \hline
     latency (ms)
-    & 0.02      & 0.02      & 0.02      & 0.02 \\ %      & 0.03      & 0.01 \\
+    & 0.02      & 0.02      & 0.02      & 0.02      & 0.02 \\ %      & 0.03      & 0.01 \\
     \hline
     Power (GFlops)
-    & 1.5       & 1.5       & 1.5       & 1.5 \\ %      & 1         & 1.5 \\
+    & 1.5       & 1.5       & 1.5       & 1.5       & 1.5 \\ %      & 1         & 1.5 \\
     \hline
     size
-    & 120       & 130       & 140       & 150  \\ %     & 171       & 171 \\
+    & 110       & 120       & 130       & 140       & 150  \\ %     & 171       & 171 \\
     \hline
     Precision
-    & \np{E-11} & \np{E-11} & \np{E-11} & \np{E-11} \\ % & \np{E-5}  & \np{E-5} \\
+    & \np{E-11} & \np{E-11} & \np{E-11} & \np{E-11} & \np{E-11} \\ % & \np{E-5}  & \np{E-5} \\
     \hline
     \hline
     Relative gain
-    & 2.51     & 2.58     & 2.55     & 2.54   \\ %  & 1.59      & 1.29 \\
+    & 2.53      & 2.51     & 2.58     & 2.55     & 2.54   \\ %  & 1.59      & 1.29 \\
     \hline
   \end{mytable}
 \end{table}
