X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/d0fb7a44ec6eaadbc682f8608e82cf129dc9c9f2..757a3d8174e2736033052c4acc64de277cd66e11:/hpcc.tex?ds=inline

diff --git a/hpcc.tex b/hpcc.tex
index 4a056f4..da2ec91 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -1,4 +1,3 @@
-
 \documentclass[conference]{IEEEtran}
 
 \usepackage[T1]{fontenc}
@@ -715,7 +714,7 @@ tool to run efficiently an iterative parallel algorithm in asynchronous
 mode in a grid architecture. 
 
 In future works, we plan to extend our experimentations to larger scale platforms by increasing the number of computing cores and the number of clusters. 
-We will also have to increase the size of the input problem which will require the use of a more powerful simulation platform. At last, we expect to compare our simulation results to real execution results on real architectures in order to experimentally validate our study.
+We will also have to increase the size of the input problem which will require the use of a more powerful simulation platform. At last, we expect to compare our simulation results to real execution results on real architectures in order to experimentally validate our study. Finally, we also plan to study other problems with the multisplitting method and other asynchronous iterative methods.
 
 \section*{Acknowledgment}
 
