X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/hpcc2014.git/blobdiff_plain/da0f693723513d54a5e075055fef01e4feb5849f..2f2f8237094c0e1c2d07da21054aafcc99672647:/hpcc.tex

diff --git a/hpcc.tex b/hpcc.tex
index 60ed377..5559af7 100644
--- a/hpcc.tex
+++ b/hpcc.tex
@@ -234,7 +234,7 @@ change and the  number of iterations to reach the  convergence will also change.
 According  to all  the parameters  of the  platform (number  of nodes,  power of
 nodes,  inter  and  intra clusrters  bandwith  and  latency, etc.) and  of  the
 algorithm  (number   of  splittings  with  the   multisplitting  algorithm),  the
-multisplitting code  will obtain the solution  more or less  quickly. Or course,
+multisplitting code  will obtain the solution  more or less  quickly. Of course,
 the GMRES method also depends of the same parameters. As it is difficult to have
 access to  many clusters,  grids or supercomputers  with many  different network
 parameters,  it  is  interesting  to  be  able  to  simulate  the  behaviors  of
