X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/kahina_paper1.git/blobdiff_plain/49fbd5bee7def05c2bcef0f608cf51adf43474c5..b5c201a21925485327afe2fb82a747570c966eca:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 3b1fb3c..e1dfd58 100644
--- a/paper.tex
+++ b/paper.tex
@@ -218,18 +218,18 @@ In this paper, we focus on the implementation of the Ehrlich-Aberth
 method for high degree polynomials on GPU. We propose an adaptation of
 the exponential logarithm in order to be able to solve sparse and full
 polynomial of degree up to $1,000,000$. The paper is organized as
-follows. Initially, we recall the Ehrlich-Aberth method in Section
-\ref{sec1}. Improvements for the Ehrlich-Aberth method are proposed in
-Section \ref{sec2}. Related work to the implementation of simultaneous
-methods using a parallel approach is presented in Section
-\ref{secStateofArt}.  In Section \ref{sec5} we propose a parallel
+follows. Initially, we recall the Ehrlich-Aberth method in
+Section~\ref{sec1}. Improvements for the Ehrlich-Aberth method are
+proposed in Section \ref{sec2}. Related work to the implementation of
+simultaneous methods using a parallel approach is presented in Section
+\ref{secStateofArt}.  In Section~\ref{sec5} we propose a parallel
 implementation of the Ehrlich-Aberth method on GPU and discuss
-it. Section \ref{sec6} presents and investigates our implementation
-and experimental study results. Finally, Section\ref{sec7} 6 concludes
+it. Section~\ref{sec6} presents and investigates our implementation
+and experimental study results. Finally, Section~\ref{sec7} 6 concludes
 this paper and gives some hints for future research directions in this
 topic.
 
-\section{The Sequential Ehrlich-Aberth method}
+\section{Ehrlich-Aberth method}
 \label{sec1}
 A cubically convergent iteration method for finding zeros of
 polynomials was proposed by O. Aberth~\cite{Aberth73}. In the
@@ -268,7 +268,7 @@ The initialization of a polynomial p(z) is done by setting each of the $n$ compl
 
 
 \subsection{Vector $z^{(0)}$ Initialization}
-
+\label{sec:vec_initialization}
 As for any iterative method, we need to choose $n$ initial guess points $z^{(0)}_{i}, i = 1, . . . , n.$
 The initial guess is very important since the number of steps needed by the iterative method to reach
 a given approximation strongly depends on it.
@@ -306,7 +306,7 @@ EA2: z^{k+1}=z_{i}^{k}-\frac{\frac{p(z_{i}^{k})}{p'(z_{i}^{k})}}
 It can be noticed that this equation is equivalent to Eq.~\ref{Eq:EA},
 but we prefer the latter one because we can use it to improve the
 Ehrlich-Aberth method and find the roots of very high degrees polynomials. More
-details are given in Section ~\ref{sec2}.
+details are given in Section~\ref{sec2}.
 \subsection{Convergence Condition}
 The convergence condition determines the termination of the algorithm. It consists in stopping the iterative function  when the roots are sufficiently stable. We consider that the method converges sufficiently when:
 
@@ -365,6 +365,7 @@ Q(z^{k}_{i})=\exp\left( \ln (p(z^{k}_{i}))-\ln(p'(z^{k}_{i}))+\ln \left(
 \end{equation}
 
 This solution is applied when the root except the circle unit, represented by the radius $R$ evaluated in C language as:
+
 \begin{verbatim}
 R = exp(log(DBL_MAX)/(2*n) );
 \end{verbatim} 
@@ -496,47 +497,54 @@ polynomials of 48000.
 
 
 
-\subsection{Sequential Ehrlich-Aberth algorithm}
-The main steps of Ehrlich-Aberth method are shown in Algorithm.~\ref{alg1-seq} :
-%\LinesNumbered  
-\begin{algorithm}[H]
-\label{alg1-seq}
+%% \subsection{Sequential Ehrlich-Aberth algorithm}
+%% The main steps of Ehrlich-Aberth method are shown in Algorithm.~\ref{alg1-seq} :
+%% %\LinesNumbered  
+%% \begin{algorithm}[H]
+%% \label{alg1-seq}
 
-\caption{A sequential algorithm to find roots with the Ehrlich-Aberth method}
+%% \caption{A sequential algorithm to find roots with the Ehrlich-Aberth method}
 
-\KwIn{$Z^{0}$ (Initial root's vector), $\varepsilon$ (error tolerance
-  threshold), P (Polynomial to solve), $\Delta z_{max}$ (maximum value
-  of stop condition), k (number of iteration), n (Polynomial's degrees)}
-\KwOut {Z (The solution root's vector), ZPrec (the previous solution root's vector)}
+%% \KwIn{$Z^{0}$ (Initial root's vector), $\varepsilon$ (error tolerance
+%%   threshold), $P$ (Polynomial to solve),$Pu$ (the derivative of P) $\Delta z_{max}$ (maximum value
+%%   of stop condition), k (number of iteration), n (Polynomial's degrees)}
+%% \KwOut {$Z$ (The solution root's vector), $ZPrec$ (the previous solution root's vector)}
 
-\BlankLine
+%% \BlankLine
 
-Initialization of the coefficients of the polynomial to solve\;
-Initialization of the solution vector $Z^{0}$\;
-$\Delta z_{max}=0$\;
- k=0\;
+%% Initialization of $P$\;
+%% Initialization of $Pu$\;
+%% Initialization of the solution vector $Z^{0}$\;
+%% $\Delta z_{max}=0$\;
+%%  k=0\;
 
-\While {$\Delta z_{max} > \varepsilon$}{
- Let $\Delta z_{max}=0$\;
-\For{$j \gets 0 $ \KwTo $n$}{
-$ZPrec\left[j\right]=Z\left[j\right]$;// save Z at the iteration k.\
+%% \While {$\Delta z_{max} > \varepsilon$}{
+%%  Let $\Delta z_{max}=0$\;
+%% \For{$j \gets 0 $ \KwTo $n$}{
+%% $ZPrec\left[j\right]=Z\left[j\right]$;// save Z at the iteration k.\
 
-$Z\left[j\right]=H\left(j,Z\right)$;//update Z with the iterative function.\
-}
-k=k+1\;
+%% $Z\left[j\right]=H\left(j, Z, P, Pu\right)$;//update Z with the iterative function.\
+%% }
+%% k=k+1\;
 
-\For{$i \gets 0 $ \KwTo $n-1$}{
-$c= testConverge(\Delta z_{max},ZPrec\left[j\right],Z\left[j\right])$\;
-\If{$c > \Delta z_{max}$ }{
-$\Delta z_{max}$=c\;}
-}
+%% \For{$i \gets 0 $ \KwTo $n-1$}{
+%% $c= testConverge(\Delta z_{max},ZPrec\left[j\right],Z\left[j\right])$\;
+%% \If{$c > \Delta z_{max}$ }{
+%% $\Delta z_{max}$=c\;}
+%% }
 
-}
-\end{algorithm}
+%% }
+%% \end{algorithm}
 
-~\\ 
-In this sequential algorithm, one CPU thread  executes all the steps. Let us look to the $3^{rd}$ step i.e. the execution of the iterative function, 2 sub-steps are needed. The first sub-step \textit{save}s the solution vector of the previous iteration, the second sub-step \textit{update}s or computes the new values of the roots vector.
-There exists two ways to execute the iterative function that we call a Jacobi one and a Gauss-Seidel one. With the Jacobi iteration, at iteration $k+1$ we need all the previous values $z^{(k)}_{i}$ to compute the new values $z^{(k+1)}_{i}$, that is :
+%% ~\\ 
+%% In this sequential algorithm, one CPU thread  executes all the steps. Let us look to the $3^{rd}$ step i.e. the execution of the iterative function, 2 sub-steps are needed. The first sub-step \textit{save}s the solution vector of the previous iteration, the second sub-step \textit{update}s or computes the new values of the roots vector.
+
+\subsection{Parallel implementation with CUDA }
+
+In order to implement the Ehrlich-Aberth method in CUDA, it is
+possible to use the Jacobi scheme or the Gauss Seidel one.  With the
+Jacobi iteration, at iteration $k+1$ we need all the previous values
+$z^{(k)}_{i}$ to compute the new values $z^{(k+1)}_{i}$, that is :
 
 \begin{equation}
 EAJ: z^{k+1}_{i}=\frac{p(z^{k}_{i})}{p'(z^{k}_{i})-p(z^{k}_{i})\sum^{n}_{j=1 j\neq i}\frac{1}{z^{k}_{i}-z^{k}_{j}}}, i=1,...,n.
@@ -548,22 +556,22 @@ With the Gauss-Seidel iteration, we have:
 EAGS: z^{k+1}_{i}=\frac{p(z^{k}_{i})}{p'(z^{k}_{i})-p(z^{k}_{i})(\sum^{i-1}_{j=1}\frac{1}{z^{k}_{i}-z^{k+1}_{j}}+\sum^{n}_{j=i+1}\frac{1}{z^{k}_{i}-z^{k}_{j}})}, i=1,...,n.
 \end{equation}
 %%Here a finiched my revision %%
-Using Equation.~\ref{eq:Aberth-H-GS} to update the vector solution
+Using Eq.~\ref{eq:Aberth-H-GS} to update the vector solution
 \textit{Z}, we expect the Gauss-Seidel iteration to converge more
 quickly because, just as any Jacobi algorithm (for solving linear systems of equations), it uses the most fresh computed roots $z^{k+1}_{i}$.
 
-The $4^{th}$ step of the algorithm checks the convergence condition using Equation.~\ref{eq:Aberth-Conv-Cond}.
-Both steps 3 and 4 use 1 thread to compute all the $n$ roots on CPU, which is very harmful for performance in case of the large degree polynomials.
+%The $4^{th}$ step of the algorithm checks the convergence condition using Eq.~\ref{eq:Aberth-Conv-Cond}.
+%Both steps 3 and 4 use 1 thread to compute all the $n$ roots on CPU, which is very harmful for performance in case of the large degree polynomials.
 
 
-\subsection{Parallel implementation with CUDA }
-On the CPU,  both steps 3 and 4 contain the loop \verb=for= and a single thread executes all the instructions in the loop $n$ times. In this subsection, we explain how the GPU architecture can compute this loop and reduce the execution time.
-In the GPU, the scheduler assigns the execution of this loop to a
-group of threads organised as a grid of blocks with block containing a
-number of threads. All threads within a block are executed
-concurrently in parallel. The instructions run on the GPU are grouped
-in special function called kernels. With CUDA, a programmer must
-describe the kernel execution context:  the size of the Grid, the number of blocks and the number of threads per block.
+
+%On the CPU,  both steps 3 and 4 contain the loop \verb=for= and a single thread executes all the instructions in the loop $n$ times. In this subsection, we explain how the GPU architecture can compute this loop and reduce the execution time.
+%In the GPU, the scheduler assigns the execution of this loop to a
+%group of threads organised as a grid of blocks with block containing a
+%number of threads. All threads within a block are executed
+%concurrently in parallel. The instructions run on the GPU are grouped
+%in special function called kernels. With CUDA, a programmer must
+%describe the kernel execution context:  the size of the Grid, the number of blocks and the number of threads per block.
 
 %In CUDA programming, all the instructions of the  \verb=for= loop are executed by the GPU as a kernel. A kernel is a function written in CUDA and defined by the  \verb=__global__= qualifier added before a usual \verb=C= function, which instructs the compiler to generate appropriate code to pass it to the CUDA runtime in order to be executed on the GPU. 
 
@@ -574,31 +582,34 @@ Algorithm~\ref{alg2-cuda} shows a sketch of the Ehrlich-Aberth algorithm using C
 %\LinesNumbered
 \caption{CUDA Algorithm to find roots with the Ehrlich-Aberth method}
 
-\KwIn{$Z^{0}$ (Initial root's vector), $\varepsilon$ (error tolerance threshold), P(Polynomial to solve), $\Delta z_{max}$ (maximum value of stop condition)}
+\KwIn{$Z^{0}$ (Initial root's vector), $\varepsilon$ (error tolerance
+  threshold), P(Polynomial to solve), Pu (the derivative of P), $n$ (Polynomial's degrees), $\Delta z_{max}$ (maximum value of stop condition)}
 
-\KwOut {Z (The solution root's vector)}
+\KwOut {$Z$ (The solution root's vector), $ZPrec$ (the previous solution root's vector)}
 
 \BlankLine
 
-Initialization of the coefficients of the polynomial to solve\;
+Initialization of the of P\;
+Initialization of the of Pu\;
 Initialization of the solution vector $Z^{0}$\;
 Allocate and copy initial data to the GPU global memory\;
 k=0\;
-\While {$\Delta z_{max}\succ \epsilon$}{
+\While {$\Delta z_{max} > \epsilon$}{
  Let $\Delta z_{max}=0$\;
-$ kernel\_save(d\_Z^{k-1})$\;
+$ kernel\_save(ZPrec,Z)$\;
 k=k+1\;
-$ kernel\_update(d\_Z^{k})$\;
-$kernel\_testConverge(\Delta z_{max},d\_Z^{k},d\_Z^{k-1})$\;
+$ kernel\_update(Z,P,Pu)$\;
+$kernel\_testConverge(\Delta z_{max},Z,ZPrec)$\;
 
 }
+Copy results from GPU memory to CPU memory\;
 \end{algorithm}
 ~\\ 
 
-After the initialisation step, all data of the root finding problem to be solved must be copied from the CPU memory to the GPU global memory, because the GPUs only access data already present in their memories. Next, all the data-parallel arithmetic operations inside the main loop \verb=(do ... while(...))= are executed as kernels by the GPU. The first kernel named \textit{save} in line 6 of Algorithm~\ref{alg2-cuda} consists in saving the vector of polynomial's root found at the previous time-step in GPU memory, in order to check the convergence of the roots after each iteration (line 8, Algorithm~\ref{alg2-cuda}).
+After the initialization step, all data of the root finding problem to be solved must be copied from the CPU memory to the GPU global memory, because the GPUs only access data already present in their memories. Next, all the data-parallel arithmetic operations inside the main loop \verb=(do ... while(...))= are executed as kernels by the GPU. The first kernel named \textit{save} in line 6 of Algorithm~\ref{alg2-cuda} consists in saving the vector of polynomial's root found at the previous time-step in GPU memory, in order to check the convergence of the roots after each iteration (line 8, Algorithm~\ref{alg2-cuda}).
 
 The second kernel executes the iterative function $H$ and updates
-$z^{k}$, according to Algorithm~\ref{alg3-update}. We notice that the
+$d\_Z$, according to Algorithm~\ref{alg3-update}. We notice that the
 update kernel is called in two forms, separated with the value of
 \emph{R} which determines the radius beyond which we apply the
 exponential logarithm algorithm. 
@@ -608,14 +619,14 @@ exponential logarithm algorithm.
 %\LinesNumbered
 \caption{Kernel update}
 
-\eIf{$(\left|Z^{(k)}\right|<= R)$}{
-$kernel\_update(d\_z^{k})$\;}
+\eIf{$(\left|Z\right|<= R)$}{
+$kernel\_update((Z,P,Pu)$\;}
 {
-$kernel\_update\_ExpoLog(d\_z^{k})$\;
+$kernel\_update\_ExpoLog((Z,P,Pu))$\;
 }
 \end{algorithm}
 
-The first form executes formula \ref{eq:SimplePolynome} if the modulus
+The first form executes formula the EA function Eq.~\ref{Eq:Hi} if the modulus
 of the current complex is less than the a certain value called the
 radius i.e. ($ |z^{k}_{i}|<= R$), else the kernel executes the EA.EL
 function Eq.~\ref{Log_H2}
@@ -689,13 +700,14 @@ to $10^{-7}$.
 %performance behaviors of Ehrlich-Aberth and Durand-Kerner methods on
 %CPUs versus on GPUs.
 The initialization values of the vector solution
-of the methods are given in section 2.2.
+of the methods are given in Section~\ref{sec:vec_initialization}.
+
 \subsection{Comparison of execution times of the Ehrlich-Aberth method
   on a CPU with OpenMP (1 core and 4 cores) vs. on a Tesla GPU}
 
 
 
-\begin{figure}[H]
+\begin{figure}[htbp]
 \centering
   \includegraphics[width=0.8\textwidth]{figures/openMP-GPU}
 \caption{Comparison of execution times  of the Ehrlich-Aberth method
@@ -711,7 +723,7 @@ In Figure~\ref{fig:01}, we report respectively the execution time of the Ehrlich
 To optimize the performances of an algorithm on a GPU, it is necessary to maximize the use of cores GPU (maximize the number of threads executed in parallel) and to optimize the use of the various memoirs GPU. In fact, it is interesting to see the influence of the number of threads per block on the execution time of Ehrlich-Aberth algorithm. 
 For that, we notice that the maximum number of threads per block for the Nvidia Tesla K40 GPU is 1024, so we varied the number of threads per block from 8 to 1024. We took into account the execution time for both sparse and full of 10 different polynomials of size 50,000 and 10 different polynomials of size 500,000 degrees.
 
-\begin{figure}[H]
+\begin{figure}[htbp]
 \centering
   \includegraphics[width=0.8\textwidth]{figures/influence_nb_threads}
 \caption{Influence of the number of threads on the execution times of different polynomials (sparse and full)}
@@ -720,35 +732,63 @@ For that, we notice that the maximum number of threads per block for the Nvidia
 
 The figure 2 show that, the best execution time for both sparse and full polynomial are given when the threads number varies between 64 and 256 threads per bloc. We notice that with small polynomials the best number of threads per block is 64, Whereas, the large polynomials the best number of threads per block is 256. However,In the following experiments we specify that the number of thread by block is 256.
 
-\subsection{The impact of exp-log solution to compute very high degrees of  polynomial}
+\subsection{The impact of exp.log solution to compute very high degrees of  polynomial}
 
-In this experiment we report the performance of log.exp solution describe in ~\ref{sec2} to compute very high degrees polynomials.   
-\begin{figure}[H]
+In this experiment we report the performance of exp-log solution described in Section~\ref{sec2} to compute very high degrees polynomials.   
+\begin{figure}[htbp]
 \centering
   \includegraphics[width=0.8\textwidth]{figures/sparse_full_explog}
-\caption{The impact of exp-log solution to compute very high degrees of  polynomial.}
+\caption{The impact of exp.log solution to compute very high degrees of  polynomial.}
 \label{fig:03}
 \end{figure}
 
-The figure 3, show a comparison between the execution time of the Ehrlich-Aberth algorithm applying exp.log solution and the execution time of the Ehrlich-Aberth algorithm without applying exp.log solution, with full and sparse polynomials degrees. We can see that the execution time for the both algorithms are the same while the full polynomials degrees are less than 4000 and full polynomials are less than 150,000. After,we show clearly that the classical version of Ehrlich-Aberth algorithm (without applying log.exp) stop to converge and can not solving any polynomial sparse or full. In counterpart, the new version of Ehrlich-Aberth algorithm (applying log.exp solution) can solve very high and large full polynomial exceed 100,000 degrees.
 
-in fact, when the modulus of the roots are up than \textit{R} given in ~\ref{R},this exceed the limited number in the mantissa of floating points representations and can not compute the iterative function given in ~\ref{eq:Aberth-H-GS} to obtain the root solution, who justify the divergence of the classical Ehrlich-Aberth algorithm. However, applying log.exp solution given in ~\ref{sec2} took into account the limit of floating using the iterative function in(Eq.~\ref{Log_H1},Eq.~\ref{Log_H2} and allows to solve a very large polynomials degrees . 
+Figure~\ref{fig:03} shows a comparison between the execution time of
+the Ehrlich-Aberth algorithm using the exp.log solution and the
+execution time of the Ehrlich-Aberth algorithm without this solution,
+with full and sparse polynomials degrees. We can see that the
+execution times for both algorithms are the same with full polynomials
+degrees less than 4000 and sparse polynomials less than 150,000. We
+also clearly show that the classical version (without log.exp) of
+Ehrlich-Aberth algorithm do not converge after these degree with
+sparse and full polynomials. In counterpart, the new version of
+Ehrlich-Aberth algorithm with the log.exp solution can solve very
+high degree polynomials.
+
+%in fact, when the modulus of the roots are up than \textit{R} given in ~\ref{R},this exceed the limited number in the mantissa of floating points representations and can not compute the iterative function given in ~\ref{eq:Aberth-H-GS} to obtain the root solution, who justify the divergence of the classical Ehrlich-Aberth algorithm. However, applying log.exp solution given in ~\ref{sec2} took into account the limit of floating using the iterative function in(Eq.~\ref{Log_H1},Eq.~\ref{Log_H2} and allows to solve a very large polynomials degrees . 
 
 
 
-\subsection{A comparative study between Ehrlich-Aberth algorithm and Durand-kerner algorithm}
-In this part, we are interesting to compare the simultaneous methods, Ehrlich-Aberth and Durand-Kerner in parallel computer using GPU. We took into account the execution time, the number of iteration and the polynomial's size. for the both sparse and full polynomials.  
 
-\begin{figure}[H]
+\subsection{Comparison of the Durand-Kerner and the Ehrlich-Aberth methods}
+
+In this part, we  compare the Durand-Kerner and the Ehrlich-Aberth
+methods on GPU. We took into account the execution time, the number of iteration and the polynomial's size for the both sparse and full polynomials.  
+
+\begin{figure}[htbp]
 \centering
   \includegraphics[width=0.8\textwidth]{figures/EA_DK}
-\caption{The execution time of Ehrlich-Aberth versus Durand-Kerner algorithm on GPU}
+\caption{Execution times of the  Durand-Kerner and the Ehrlich-Aberth methods on GPU}
 \label{fig:04}
 \end{figure}
 
-This figure show the execution time of the both algorithm EA and DK with sparse polynomial degrees ranging from 1000 to 1000000. We can see that the Ehrlich-Aberth algorithm are faster than Durand-Kerner algorithm, with an average of 25 times as fast. Then, when degrees of polynomial exceed 500000 the execution time with EA is of the order 100 whereas DK passes in the order 1000. %with double precision not exceed $10^{-5}$.
+\begin{figure}[htbp]
+\centering
+  \includegraphics[width=0.8\textwidth]{figures/EA_DK1}
+\caption{Execution times of the  Durand-Kerner and the Ehrlich-Aberth methods on GPU}
+\label{fig:0}
+\end{figure}
+
+Figure~\ref{fig:04} shows the execution times of both methods with
+sparse polynomial degrees ranging from 1,000 to 1,000,000. We can see
+that the Ehrlich-Aberth algorithm is faster than Durand-Kerner
+algorithm, with an average of 25 times faster. Then, when degrees of
+polynomial exceed 500000 the execution time with EA is of the order
+100 whereas DK passes in the order 1000.
+
+%with double precision not exceed $10^{-5}$.
 
-\begin{figure}[H]
+\begin{figure}[htbp]
 \centering
   \includegraphics[width=0.8\textwidth]{figures/EA_DK_nbr}
 \caption{The iteration number of Ehrlich-Aberth versus Durand-Kerner algorithm}
