X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/kahina_paper1.git/blobdiff_plain/f3cbb035ec5c163d367699cff06a3c8ee10ea89d..d2eaa5b6b9f4ba47dbfa2aeaae51427945accf72:/paper.tex

diff --git a/paper.tex b/paper.tex
index 9532afc..04e1316 100644
--- a/paper.tex
+++ b/paper.tex
@@ -717,9 +717,20 @@ This figure show the execution time of the both algorithm EA and DK with sparse
 \label{fig:01}
 \end{figure}
 
-\bibliography{mybibfile}
+\subsubsection{The execution time of Ehrlich-Aberth algorithm on OpenMP(1 core, 4 cores) vs. on a Tesla GPU}
+
+\begin{figure}[H]
+\centering
+  \includegraphics[width=0.8\textwidth]{figures/openMP-GPU}
+\caption{The execution time of Ehrlich-Aberth algorithm on OpenMP(1core, 4cores) and GPU(Tesla k40)}
+\label{fig:01}
+\end{figure}
+
+
 
 
 \section{Conclusion and perspective}
 
+\bibliography{mybibfile}
+
 \end{document}
