X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/kahina_paper2.git/blobdiff_plain/3afb8ef68cbf6eadd54fd00ebcfcef99abdf42e5..4b3ba00ad3edb6f2c001e4a4e842ed4a2a8bb566:/paper.tex

diff --git a/paper.tex b/paper.tex
index 93aeced..489b65b 100644
--- a/paper.tex
+++ b/paper.tex
@@ -805,7 +805,7 @@ Copy results from GPU memory to CPU memory\;
  
 \section{The EA algorithm on Multiple GPUs}
 \label{sec4}
-\subsection{M-GPU : an OpenMP-CUDA approach}
+\subsection{an OpenMP-CUDA approach}
 Our OpenMP-CUDA implementation of EA algorithm is based on the hybrid
 OpenMP and CUDA programming model.  All the data
 are shared with OpenMP amoung all the OpenMP threads. The shared data
@@ -895,7 +895,7 @@ $  error= Max(\Delta z)$\;
 
 
 
-\subsection{Multi-GPU : an MPI-CUDA approach}
+\subsection{an MPI-CUDA approach}
 %\begin{figure}[htbp]
 %\centering
  % \includegraphics[angle=-90,width=0.2\textwidth]{MPI-CUDA}
