X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/kahina_paper2.git/blobdiff_plain/459ef255863b95b5898e77f4d1eaf7c28d197bb5..72b8c7d942e80fd4d5d76f2ed0ad0f899a085d85:/paper.tex

diff --git a/paper.tex b/paper.tex
index b901a2f..32c2753 100644
--- a/paper.tex
+++ b/paper.tex
@@ -564,17 +564,11 @@ Algorithm~\ref{alg2-cuda} shows a sketch of the Ehrlich-Aberth method using CUDA
  
 \section{The EA algorithm on Multi-GPU}
 
-\subsection{MGPU (OpenMP-CUDA)approach}
-begin{figure}[htbp]
-\centering
-  \includegraphics[angle=-90,width=0.8\textwidth]{GPU_openmp}
-\caption{Execution times in seconds of the Ehrlich-Aberth method on GPUs using shared memory paradigm with OpenMP}
-\label{fig:01}
-\end{figure}
-
 \subsection{MGPU (OpenMP-CUDA)approach}
 \subsection{MGPU (MPI-CUDA)approach}
+
 \section{experiments}
+
 \begin{figure}[htbp]
 \centering
   \includegraphics[angle=-90,width=0.8\textwidth]{GPU_openmp}
@@ -588,9 +582,7 @@ begin{figure}[htbp]
 \caption{Execution times in seconds of the Ehrlich-Aberth method on GPUs using distributed memory paradigm with MPI}
 \label{fig:02}
 \end{figure}
-\subsection{MGPU (MPI-CUDA)approach}
 
-\section{experiments}
 % An example of a floating figure using the graphicx package.
 % Note that \label must occur AFTER (or within) \caption.
 % For figures, \caption should occur after the \includegraphics.
