X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/kahina_paper2.git/blobdiff_plain/a8861defbc59813ec128a41e8a31756df1ea94ba..3864e7ed8025aaf8e3b0f5b2fb28a64dc4aa4b76:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 4f6ae4b..c514b43 100644
--- a/paper.tex
+++ b/paper.tex
@@ -218,7 +218,7 @@ long since it performs all the operations with complex numbers with
 the normal mode of the EA method but also with the
 logarithm-exponential one. Then the error is computed with a final
 kernel (line 7). Finally when the EA method has converged, the roots
-are transferred from the GPU to the CPU.%\LZK{Quand est ce qu'on utilise un normal mode ou logarithm-exponential mode?}
+are transferred from the GPU to the CPU.
 
 \begin{algorithm}[htpb]
 \label{alg1-cuda}
@@ -309,7 +309,6 @@ Copy $P$, $P'$ from CPU to GPU\;
 
 
 \subsection{A MPI-CUDA approach}
-
 Our parallel implementation of EA to find roots of polynomials using a
 CUDA-MPI approach follows a similar approach to the one used in
 CUDA-OpenMP. Each process is responsible to compute its own part of
