X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/kahina_paper2.git/blobdiff_plain/bee311b2c8d32ff85b04e4d21e3ae9df2f25da8b..04b0521165b711c1063f8f897b55e1863bb75bbc:/paper.tex

diff --git a/paper.tex b/paper.tex
index 7bba549..a96db5d 100644
--- a/paper.tex
+++ b/paper.tex
@@ -611,6 +611,20 @@ Algorithm~\ref{alg2-cuda} shows a sketch of the Ehrlich-Aberth method using CUDA
 \label{fig:06}
 \end{figure}
 
+\begin{figure}[htbp]
+\centering
+  \includegraphics[angle=-90,width=0.5\textwidth]{MPI_mpivsomp}
+\caption{Comparaison of execution times of the Ehrlich-Aberth method for solving sparse and full polynomials on GPUs with distributed memory paradigm using MPI}
+\label{fig:07}
+\end{figure}
+
+\begin{figure}[htbp]
+\centering
+  \includegraphics[angle=-90,width=0.5\textwidth]{OMP_mpivsomp}
+\caption{Comparaison of execution times of the Ehrlich-Aberth method for solving sparse and full polynomials on GPUs with shared memory paradigm using OpenMP}
+\label{fig:08}
+\end{figure}
+
 % An example of a floating figure using the graphicx package.
 % Note that \label must occur AFTER (or within) \caption.
 % For figures, \caption should occur after the \includegraphics.
