X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/loba-papers.git/blobdiff_plain/1630e7fa688ea1692b8a13f554924252b4047321..50178272468b88cae817c0950ad973d3b8dbca74:/loba-besteffort/loba-besteffort.tex?ds=inline

diff --git a/loba-besteffort/loba-besteffort.tex b/loba-besteffort/loba-besteffort.tex
index 9007b17..2d0f414 100644
--- a/loba-besteffort/loba-besteffort.tex
+++ b/loba-besteffort/loba-besteffort.tex
@@ -45,8 +45,13 @@
 \author{Arnaud Giersch\corref{cor}}
 \ead{arnaud.giersch@femto-st.fr}
 
-\address{FEMTO-ST, University of Franche-ComtÃ©\\
- 19 avenue du MarÃ©chal Juin, BP 527, 90016 Belfort cedex, France}
+\address{%
+  Institut FEMTO-ST (UMR 6174),
+  UniversitÃ© de Franche-ComtÃ© (UFC),
+  Centre National de la Recherche Scientifique (CNRS),
+  Ãcole Nationale SupÃ©rieure de MÃ©canique et des Microtechniques (ENSMM),
+  UniversitÃ© de Technologie de Belfort MontbÃ©liard (UTBM)\\
+  19 avenue du MarÃ©chal Juin, BP 527, 90016 Belfort cedex, France}
 
 \cortext[cor]{Corresponding author.}
 
