X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/loba-papers.git/blobdiff_plain/1c24f60b352adf4db2002f7a82ca418cfc8d8add..f13866736c2d1dda2bc227e4a05626ea5535e7d6:/supercomp11/supercomp11.tex?ds=inline

diff --git a/supercomp11/supercomp11.tex b/supercomp11/supercomp11.tex
index a26ad3a..1faf1b0 100644
--- a/supercomp11/supercomp11.tex
+++ b/supercomp11/supercomp11.tex
@@ -497,8 +497,9 @@ an amount of load at less than 1\% of the load average, during an arbitrary
 number of computing iterations (2000 in our case).
 
 Note that this convergence detection was implemented in a centralized manner.
-This is easy to do within the simulator, but it's obviously not realistic.  In
-a real application we would have chosen a decentralized convergence detection algorithm, like the one described in \cite{10.1109/TPDS.2005.2}.
+This is easy to do within the simulator, but it's obviously not realistic.  In a
+real application we would have chosen a decentralized convergence detection
+algorithm, like the one described in \cite{10.1109/TPDS.2005.2}.
 
 \paragraph{Platforms}
 
