X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/loba-papers.git/blobdiff_plain/db33461e614769b3c7c7a8239ebf75a014ec3041..5432212c4bb6f191fc44cb3d0e4b1e66aa3dd9e8:/loba-besteffort/loba-besteffort.tex

diff --git a/loba-besteffort/loba-besteffort.tex b/loba-besteffort/loba-besteffort.tex
index d774cce..44a6853 100644
--- a/loba-besteffort/loba-besteffort.tex
+++ b/loba-besteffort/loba-besteffort.tex
@@ -603,6 +603,7 @@ Anyway, all these the experiments represent more than 240 hours of computing
 time.
 
 \subsubsection{Metrics}
+\label{sec.metrics}
 
 In order to evaluate and compare the different load balancing strategies we had
 to define several metrics.  Our goal, when choosing these metrics, was to have
@@ -708,13 +709,13 @@ On each of the figures~\ref{fig.results1} and~\ref{fig.resultsN}, the results
 are given for the process topology being, from top to bottom, a line, a torus or
 an hypercube.
 
-\FIXME{explain how to read the graphs}
-
-each bar -> times for an algorithm
-recall the different times
-no bar -> not run or did not converge in allocated time
-
-repeated for the different platform sizes.
+Finally, on the graphs, the vertical bars show the measured times for each of
+the algorithms.  These measured times are, from bottom to top, the average idle
+time, the average convergence date, and the maximum convergence date (see
+Section~\ref{sec.metrics}).  The measurements are repeated for the different
+platform sizes.  Some bars are missing, specially for large platforms.  This is
+either because the algorithm did not reach the convergence state in the
+allocated time, or because we simply decided not to run it.
 
 \FIXME{donner les premiÃ¨res conclusions, annoncer le plan de la suite}
 
