X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/loba-papers.git/blobdiff_plain/f3f57de44c8e94b6bab37e9f0eb1daf631e2aeca..a63036f3425d8303146d21053b097d533b3a6521:/loba-besteffort/loba-besteffort.tex

diff --git a/loba-besteffort/loba-besteffort.tex b/loba-besteffort/loba-besteffort.tex
index 00cb3c5..03cb38c 100644
--- a/loba-besteffort/loba-besteffort.tex
+++ b/loba-besteffort/loba-besteffort.tex
@@ -803,13 +803,24 @@ with the same condition.
 
 
 
-\subsubsection{With integer load, 1 ou N}
+\subsubsection{With integer load}
 
-Cas normal, ligne -> converge pas (effet d'escalier).
-Avec vload, Ã§a converge.
+We also performed  some experiments with integer load instead  of load with real
+value.  In  this case, the  results have globally  the same behavior.   The most
+intereting  result, from  our point  of view,  is that  the virtual  mode allows
+processors in a line topology to converge to the uniform load balancing. Without
+the virtual  load, most  of the time,  processors converge  to what we  call the
+``stairway effect'', that  is to say that  there is only a difference  of one in
+the load of each processor and its neighbors (for example with 10 processors, we
+obtain 10 9 8 7 6 6 7 8 9 10 instead of 8 8 8 8 8 8 8 8 8 8).
 
-Dans les autres cas, rÃ©sultats similaires au cas rÃ©el: redire que vload est
-intÃ©ressant.
+%Cas normal, ligne -> converge pas (effet d'escalier).
+%Avec vload, Ã§a converge.
+
+%Dans les autres cas, rÃ©sultats similaires au cas rÃ©el: redire que vload est
+%intÃ©ressant.
+
+\FIXME{ajouter une courbe avec l'Ã©quilibrage en entier}
 
 \FIXME{virer la metrique volume de comms}
 
