X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/0a5c63daac4a17dc16888d3374c97a6548e5feb5..HEAD:/paper.tex

diff --git a/paper.tex b/paper.tex
index 91fa988..e62908a 100644
--- a/paper.tex
+++ b/paper.tex
@@ -4,7 +4,7 @@
 \usepackage[utf8]{inputenc}
 \usepackage[english]{babel}
 \usepackage{algpseudocode}
-\usepackage{graphicx,graphics}
+\usepackage{graphicx}
 \usepackage{subfig}
 \usepackage{amsmath}
 
