X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/1363b18681b25125f146fac02ae6061f10f15606..5fa15928277e7d3d53bfae502c1309d4f51370ee:/paper.tex

diff --git a/paper.tex b/paper.tex
index 53a1cf7..6a21f74 100644
--- a/paper.tex
+++ b/paper.tex
@@ -208,7 +208,7 @@ selection method which has the following characteristics:
 \item It is well adapted to distributed architectures because it takes into
   account the communication time.
 \item It is well adapted to distributed applications with imbalanced tasks.
-\item it has very small footprint when compared to other methods
+\item It has very small footprint when compared to other methods
   (e.g.,~\cite{19}) and does not require profiling or training as
   in~\cite{38,34}.
 \end{enumerate}
@@ -839,7 +839,7 @@ known in advance and depends on the global convergence of the iterative system.
 
 \section*{Acknowledgment}
 
-This work has been supported by the Labex ACTION project (contract
+This work has been partially supported by the Labex ACTION project (contract
 ``ANR-11-LABX-01-01'').  Computations have been performed on the supercomputer
 facilities of the MÃ©socentre de calcul de Franche-ComtÃ©.  As a PhD student,
 Mr. Ahmed Fanfakh, would like to thank the University of Babylon (Iraq) for
