X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/22f42ac179e2dfe1d37b10bb9a421ae3e8eea73b..797d75d9ecea842e8e1849bfe462555ec8057c0e:/paper.tex?ds=inline

diff --git a/paper.tex b/paper.tex
index 8c272cb..0be7216 100644
--- a/paper.tex
+++ b/paper.tex
@@ -513,7 +513,7 @@ same time from all available scaling factors.
   \includegraphics[width=.328\textwidth]{lu.eps}\hfill%
   \includegraphics[width=.328\textwidth]{bt.eps}\hfill%
   \includegraphics[width=.328\textwidth]{ft.eps}
-  \caption{Optimal scaling factors for predicted energy and performance of NAS benchmarks}
+  \caption{Optimal scaling factors for the predicted energy and performance of NAS benchmarks}
   \label{fig:nas}
 \end{figure*}
 \begin{table}[htb]
