X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/22f42ac179e2dfe1d37b10bb9a421ae3e8eea73b..fc20676487bb4d1c3cbbb02b997cb299156b00b5:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 8c272cb..47be6a4 100644
--- a/paper.tex
+++ b/paper.tex
@@ -33,7 +33,7 @@
     University of Franche-ComtÃ©\\
     IUT de Belfort-Montb\'{e}liard, Rue Engel Gros, BP 27, 90016 Belfort, France\\
    Fax  : (+33)~3~84~58~77~32\\
-   Email: \{jean-claude.charr, raphael.couturier, ahmed.fanfakh, arnaud.giersch\}@univ-fcomte.fr
+   Email: \{jean-claude.charr, raphael.couturier, ahmed.fanfakh\_badri\_muslim, arnaud.giersch\}@univ-fcomte.fr
    }
   }
 
@@ -513,7 +513,7 @@ same time from all available scaling factors.
   \includegraphics[width=.328\textwidth]{lu.eps}\hfill%
   \includegraphics[width=.328\textwidth]{bt.eps}\hfill%
   \includegraphics[width=.328\textwidth]{ft.eps}
-  \caption{Optimal scaling factors for predicted energy and performance of NAS benchmarks}
+  \caption{Optimal scaling factors for the predicted energy and performance of NAS benchmarks}
   \label{fig:nas}
 \end{figure*}
 \begin{table}[htb]
