X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/43905e2e8c50ec820f6060f3d119c1cb8461c596..4b6d80813dd8f58434a111f585d96547e5893a55:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 832d62f..42d2248 100644
--- a/paper.tex
+++ b/paper.tex
@@ -285,7 +285,7 @@ function of the scaling factor $S$, as in EQ~\eqref{eq:energy}.
     \left( T_1 + \sum_{i=2}^{N} \frac{T_i^3}{T_1^2} \right) +
       \Pstatic \cdot T_1 \cdot S_1 \cdot N
 \end{equation}
-where $N$ is the number of parallel nodes, $T_i$ for $i=1,\dots,N$ are
+where $N$ is the number of parallel nodes, $T_i$ and $S_i$ for $i=1,\dots,N$ are
 the execution times and scaling factors of the sorted tasks.  Therefore, $T_1$ is
 the time of the slowest task, and $S_1$ its scaling factor which should be the
 highest because they are proportional to the time values $T_i$.  The scaling
