X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/54f46121a75e956d34732d72d492999871eb2658..a61f50d29efe27025514a6a5e34444845de7fe9b:/paper.tex?ds=inline

diff --git a/paper.tex b/paper.tex
index 5d40a37..3c9c6c3 100644
--- a/paper.tex
+++ b/paper.tex
@@ -119,7 +119,7 @@ we conclude in Section~\ref{sec.concl}.
 \section{Related Works}
 \label{sec.relwork}
 
-\AG{Consider introducing the models sec.~\ref{sec.exe} maybe before related works}
+\AG{Consider introducing the models (sec.~\ref{sec.exe}) before related works}
 
 In this section, some heuristics to compute the scaling factor are
 presented and classified into two categories: offline and online methods.
@@ -718,7 +718,7 @@ In the near future, we would like to adapt this scaling factor selection method
 As a PhD student, M. Ahmed Fanfakh, would like to thank the University of
 Babylon (Iraq) for supporting his work.
 
-\JC{delete the online paths for each reference}
+\JC{delete the online paths for each reference\AG{except for TOP500 and the NPB}}
 % trigger a \newpage just before the given reference
 % number - used to balance the columns on the last page
 % adjust value as needed - may need to be readjusted if
