X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/5cbb41e9f46ba582a492088627d2e1533092f205..8f74abded8779bc4f942cba14e8b02f7d62c5382:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 332f1f1..f6794f5 100644
--- a/paper.tex
+++ b/paper.tex
@@ -571,7 +571,7 @@ same time over all available scales.
   \AG{Use the same number of decimals for all numbers in a column,
     and vertically align the numbers along the decimal points.
     The same for all the following tables.}
-  \begin{tabular}{ | l | l | l |l | r |}
+  \begin{tabular}{|l|*{4}{r|}}
     \hline
     Program & Optimal & Energy  & Performance&Energy-Perf.\\
     Name & Scaling Factor& Saving \%&Degradation \% &Distance  \\ \hline
@@ -612,7 +612,7 @@ benchmarks programs for classes A,B and C.
   \caption{Comparing Results for  The NAS Class A}
   % title of Table
   \centering
-  \begin{tabular}{ | l | l | l |l | l | r|  }
+  \begin{tabular}{|l|l|*{4}{r|}}
     \hline
     Method&Program&Factor& Energy& Performance &Energy-Perf.\\
     Name &Name&Value& Saving \%&Degradation \% &Distance
@@ -653,7 +653,7 @@ benchmarks programs for classes A,B and C.
   \caption{Comparing Results for The NAS Class B}
   % title of Table
   \centering
-  \begin{tabular}{ | l | l | l |l | l |r|  }
+  \begin{tabular}{|l|l|*{4}{r|}}
     \hline
     Method&Program&Factor& Energy& Performance &Energy-Perf.\\
     Name &Name&Value& Saving \%&Degradation \% &Distance
@@ -695,7 +695,7 @@ benchmarks programs for classes A,B and C.
   \caption{Comparing Results for The NAS Class C}
   % title of Table
   \centering
-  \begin{tabular}{ | l | l | l |l | l |r|  }
+  \begin{tabular}{|l|l|*{4}{r|}}
     \hline
     Method&Program&Factor& Energy& Performance &Energy-Perf.\\
     Name &Name&Value& Saving \%&Degradation \% &Distance
