X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/5cbb41e9f46ba582a492088627d2e1533092f205..9b8155e7b3b8a90231159f4424dbd6b177a140e2:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 332f1f1..89f43e9 100644
--- a/paper.tex
+++ b/paper.tex
@@ -9,11 +9,10 @@
 \usepackage{listings}
 \usepackage{colortbl}
 \usepackage{amsmath}
-% \usepackage{sectsty}
-% \usepackage{titlesec}
-% \usepackage{secdot}
-%\usepackage[font={footnotesize,bt}]{caption}
-%\usepackage[font=scriptsize,labelfont=bf]{caption}
+
+\usepackage[autolanguage,np]{numprint}
+\renewcommand*\npunitcommand[1]{\text{#1}}
+
 \usepackage{xspace}
 \usepackage[textsize=footnotesize]{todonotes}
 \newcommand{\AG}[2][inline]{\todo[color=green!50,#1]{\sffamily\textbf{AG:} #2}\xspace}
@@ -525,11 +524,11 @@ frequencies.
   \caption{Platform File Parameters}
   % title of Table
   \centering
-  \begin{tabular}{ | l | l | l |l | l |l |l |  p{2cm} |}
+  \begin{tabular}{|*{7}{l|}}
     \hline
     Max & Min & Backbone & Backbone&Link &Link& Sharing  \\
     Freq. & Freq. & Bandwidth & Latency & Bandwidth& Latency&Policy  \\ \hline
-    2.5 &800 & 2.25 GBps &$5\times 10^{-7} s$& 1 GBps & $5\times 10^{-5} s$ &Full  \\
+    \np{2.5} & \np{800} & \np[GBps]{2.25} &\np[$\mu$s]{0.5}& \np[GBps]{1} & \np[$\mu$s]{50} &Full  \\
     GHz& MHz&  & & &  &Duplex  \\\hline
   \end{tabular}
   \label{table:platform}
@@ -571,7 +570,7 @@ same time over all available scales.
   \AG{Use the same number of decimals for all numbers in a column,
     and vertically align the numbers along the decimal points.
     The same for all the following tables.}
-  \begin{tabular}{ | l | l | l |l | r |}
+  \begin{tabular}{|l|*{4}{r|}}
     \hline
     Program & Optimal & Energy  & Performance&Energy-Perf.\\
     Name & Scaling Factor& Saving \%&Degradation \% &Distance  \\ \hline
@@ -612,7 +611,7 @@ benchmarks programs for classes A,B and C.
   \caption{Comparing Results for  The NAS Class A}
   % title of Table
   \centering
-  \begin{tabular}{ | l | l | l |l | l | r|  }
+  \begin{tabular}{|l|l|*{4}{r|}}
     \hline
     Method&Program&Factor& Energy& Performance &Energy-Perf.\\
     Name &Name&Value& Saving \%&Degradation \% &Distance
@@ -653,7 +652,7 @@ benchmarks programs for classes A,B and C.
   \caption{Comparing Results for The NAS Class B}
   % title of Table
   \centering
-  \begin{tabular}{ | l | l | l |l | l |r|  }
+  \begin{tabular}{|l|l|*{4}{r|}}
     \hline
     Method&Program&Factor& Energy& Performance &Energy-Perf.\\
     Name &Name&Value& Saving \%&Degradation \% &Distance
@@ -695,7 +694,7 @@ benchmarks programs for classes A,B and C.
   \caption{Comparing Results for The NAS Class C}
   % title of Table
   \centering
-  \begin{tabular}{ | l | l | l |l | l |r|  }
+  \begin{tabular}{|l|l|*{4}{r|}}
     \hline
     Method&Program&Factor& Energy& Performance &Energy-Perf.\\
     Name &Name&Value& Saving \%&Degradation \% &Distance
