X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/70760e222f4b5ce42648eaec2037aaf40629c2e8..0a5c63daac4a17dc16888d3374c97a6548e5feb5:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 18115f5..91fa988 100644
--- a/paper.tex
+++ b/paper.tex
@@ -701,6 +701,7 @@ supporting his work.
 % the document is modified later
 %\IEEEtriggeratref{15}
 
+\newpage
 \bibliographystyle{IEEEtran}
 \bibliography{IEEEabrv,my_reference}
 \end{document}
