X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/70760e222f4b5ce42648eaec2037aaf40629c2e8..e10a2fae800c41166633eabe0cff9e7815befda7:/paper.tex

diff --git a/paper.tex b/paper.tex
index 18115f5..e62908a 100644
--- a/paper.tex
+++ b/paper.tex
@@ -4,7 +4,7 @@
 \usepackage[utf8]{inputenc}
 \usepackage[english]{babel}
 \usepackage{algpseudocode}
-\usepackage{graphicx,graphics}
+\usepackage{graphicx}
 \usepackage{subfig}
 \usepackage{amsmath}
 
@@ -701,6 +701,7 @@ supporting his work.
 % the document is modified later
 %\IEEEtriggeratref{15}
 
+\newpage
 \bibliographystyle{IEEEtran}
 \bibliography{IEEEabrv,my_reference}
 \end{document}
