X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/845f556819a9813a51b3abcb1c400f14d8a9716b..5017884d6fc1bc2a3190b215a735daab4b5c9c35:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index e60d17b..e1a6c6a 100644
--- a/paper.tex
+++ b/paper.tex
@@ -708,7 +708,7 @@ In the near future, we would like to adapt this scaling factor selection method
 
 
 \section*{Acknowledgment}
-Computations have been performed on the supercomputer facilities of the
+This work has been supported by the Labex ACTION project (contract ``ANR-11-LABX-01-01'').Computations have been performed on the supercomputer facilities of the
 MÃ©socentre de calcul de Franche-ComtÃ©. As a PhD student, M. Ahmed Fanfakh, would like to thank the University of
 Babylon (Iraq) for supporting his work.
 
