X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/9cf953b2bfe1f9fdfbf76e564f4df0ad6f64b4ed..66d5b94864bc79a19000b059b00006c50d5814d4:/paper.tex

diff --git a/paper.tex b/paper.tex
index 29f175b..1ce9ae1 100644
--- a/paper.tex
+++ b/paper.tex
@@ -34,6 +34,9 @@
 
 \section{Introduction}
 
+bla bla bla
+
+
 The need for computing power is still increasing and it is not expected to slow
 down in the coming years. To satisfy this demand, researchers and supercomputers
 constructors have been regularly increasing the number of computing cores in
