X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/b2262ee9530b5234c561238254ac443994edef36..0758dda69cea0d33bd22557cfe1935c2c52d19f7:/paper.tex?ds=sidebyside

diff --git a/paper.tex b/paper.tex
index 9d65cfb..832d62f 100644
--- a/paper.tex
+++ b/paper.tex
@@ -286,7 +286,7 @@ function of the scaling factor $S$, as in EQ~\eqref{eq:energy}.
       \Pstatic \cdot T_1 \cdot S_1 \cdot N
 \end{equation}
 where $N$ is the number of parallel nodes, $T_i$ for $i=1,\dots,N$ are
-the execution times and scaling factors of the sorted tasks.  Therefore, $T1$ is
+the execution times and scaling factors of the sorted tasks.  Therefore, $T_1$ is
 the time of the slowest task, and $S_1$ its scaling factor which should be the
 highest because they are proportional to the time values $T_i$.  The scaling
 factors are computed as in EQ~\eqref{eq:si}.
