X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/mpi-energy.git/blobdiff_plain/e362b6f1fdd996fa1e2bfe7748ba970b853fac57..19523ee5dd2ff4cacca09afc323219b043df3752:/paper.tex?ds=inline

diff --git a/paper.tex b/paper.tex
index 350a303..3e0f96d 100644
--- a/paper.tex
+++ b/paper.tex
@@ -32,14 +32,15 @@
   \IEEEauthorblockA{%
     FEMTO-ST Institute\\
     University of Franche-ComtÃ©\\
-    IUT de Belfort-Montb\'{e}liard, Rue Engel Gros, BP 27, 90016 Belfort, France\\
-   Fax  : (+33)~3~84~58~77~32\\
-   Email: \{jean-claude.charr, ahmed.fanfakh, raphael.couturier, arnaud.giersch\}@univ-fcomte.fr
+    IUT de Belfort-MontbÃ©liard, 19 avenue du MarÃ©chal Juin, BP 527, 90016 Belfort cedex, France\\
+    Fax  : +33~3~84~58~77~32\\
+    Email: \{jean-claude.charr, ahmed.fanfakh\_badri\_muslim, raphael.couturier, arnaud.giersch\}@univ-fcomte.fr
    }
   }
 
 \maketitle
 
+\AG{Is the fax number correct? Shall we add a telephone number?}
 \JC{Use Capital letters for only the first letter in the title of a section, table, figure, ...} 
 \begin{abstract}
   Dynamic Voltage Frequency Scaling (DVFS) can be applied to modern CPUs. 
@@ -561,8 +562,8 @@ optimal level without considering the performance as in EQ~(\ref{eq:sopt}). We
 refer to this scenario as $R_{E}$. The second scenario is similar to the first
 except setting the slower task to the maximum frequency (when the scale $S=1$)
 to keep the performance from degradation as mush as possible. We refer to this
-scenario as $R_{E-P}$. The comparison is made in tables~(\ref{table:compare
-  Class A},\ref{table:compare Class B},\ref{table:compare Class C}). These
+scenario as $R_{E-P}$. The comparison is made in tables~(\ref{table:compareA},
+\ref{table:compareB}, and \ref{table:compareC}). These
 tables show the results of our method and Rauber and RÃ¼nger scenarios for all the
 NAS benchmarks programs for classes A,B and C.
 \begin{table}[p]
